)^2 mass(GeV/c

2 3 4 5

2c entries per 40 MeV/

10000

20000

30000

40000

50000

60000 centrality: 0% - 10%

/NDF (1.5, 5.0) = 1.4 2χ

2 3 4 5

-500

0

500

1000 448 ± signal: 3486 0.2 % ± S/B: 1.8 1.0 ± : 7.8 S+B S/ /NDF (1.5, 5.0) = 1.4 2χ

)^2 mass(GeV/c

2 3 4 5

2000

4000

6000

8000

SE opposite-sign ME opposite-sign centrality: 10% - 40% /NDF (1.5, 5.0) = 1.3 2χ

ALICE =2.76 TeV NNs Pb-Pb

2 3 4 5

-200

0

200

400 157 ± signal: 1271 0.7 % ± S/B: 5.6 1.0 ± : 8.2 S+B S/ /NDF (1.5, 5.0) = 1.2 2χ

Data MC )^2 mass(GeV/c

2 3 4 5

50

100

150

200

250 300 centrality: 40% - 90% /NDF (1.5, 5.0) = 1.0 2χ

)^2c

(GeV/ eem 2 3 4 5 -40 -20 0 20 40 60 33± signal: 192 4.0 % ± S/B: 23.6 0.9 ± : 6.1 S+B S/ /NDF (1.5, 5.0) = 0.9 2χ